##  Cycle diurne  ou non                 
cycle_diurne=y
##  Soil Model  ou non               
soil_model=y
## Nombre  d'appels des routines de rayonnements ( par jour)                 
nbapp_rad=24
##  Facteur additif pour l'albedo
pmagic=0.0
#
# Parametres "orbitaux/ ere geologique"
#
### R_ecc =      Excentricite
R_ecc = 0.016715
### R_peri =     Equinoxe
R_peri = 102.7
### R_incl =     Inclinaison
R_incl = 23.441
### solaire =    Constante solaire
solaire = 1365.6537
#
# Taux gaz a effet de serre
#
### co2_ppm =    taux CO2 en ppm
co2_ppm = 0.28472500E+03
### CH4_ppb =    taux CH4 en ppb
CH4_ppb = 0.79097924E+03
### N2O_ppb =    taux N2O en ppb
N2O_ppb = 0.27542506E+03
### CFC11_ppt =  taux CFC11 en ppt
CFC11_ppt = 0.
### CFC12_ppt =  taux CFC12 en ppt
CFC12_ppt = 0.
#
# Parametres effets directs/indirects des "aerosols"
#
### ok_ade=y/n   flag Aerosol direct effect
ok_ade=y
### ok_aie=y/n   flag Aerosol indirect effect
ok_aie=y
### aer_type =   Aerosol variation type : actuel / preind / scenario / annuel
aer_type=preind
###  type of coupled aerosol =1 (default) =2 => bc  only =3 => pom only =4 => seasalt only =5 => dust only =6 => all aerosol
flag_aerosol=6 
### bl95_b0 =    Parameter in CDNC-maer link (Boucher&Lohmann 1995)
bl95_b0=1.7
### bl95_b1 =    Parameter in CDNC-maer link (Boucher&Lohmann 1995)
bl95_b1=0.2
#
# Parametre de lecture de l'ozone
#
# Allowed values are 0, 1 and 2
# 0: do not read an ozone climatology
# 1: read a single ozone climatology that will be used day and night
# 2: read two ozone climatologies, the average day and night climatology and the daylight climatology
read_climoz=2
