#######################################################################
# parametres pour INCA
#######################################################################
#climatological=y --> use 10m wind from LMDZ, =n --> use 10m wind from output file
LMDZ_10m_winds=_AUTO_
10m_winds_method=_AUTO_
#freq_write_chem --> write frequency for inca_inst and inca_avgr (86400 = 1/day)
freq_write_chem=_AUTO_
#choose if there is a feedback with the areosol effect
feedb=_AUTO_
#indicate if we are running with xios and/or ioipsl
XIOS_INCA_OK=_AUTO_
IOIPSL_INCA_OK=_AUTO_
#weibull 10m wind parameter
kref=4.0
#threshold 10m wind parameter
tref=0.85
