#
# ChangeLog for XIOS/dev/dev_trunk_omp/GENERIC_TESTCASE/test_function/checkfile.def
#
# Generated by Trac 1.0.1
# 07/13/24 23:01:44

Thu, 03 Oct 2019 15:09:01 GMT yushan [1733]
	* XIOS/dev/dev_trunk_omp/GENERIC_TESTCASE/test_function/checkfile.def (added)

	GENERIC_TESTCASE : add checkfile.def for test_function


