#
# ChangeLog for NEMO/branches/2017/dev_r7881_no_wrk_alloc/DOC/NEMO_coding.conv.tex
#
# Generated by Trac 1.0.1
# 2024-06-21T23:59:47+02:00

Wed, 30 May 2018 14:26:44 GMT nicolasmartin [9693]
	* NEMO/branches/2017 (moved)
	* NEMO/branches/2018 (moved)
	* NEMO/branches/CNRS (moved)

	Reorganisation plan for NEMO repository: move non-British branches
	from ...


Thu, 13 Apr 2017 13:51:41 GMT timgraham [7909]
	* branches/2017/dev_r7881_no_wrk_alloc (copied)

	Branch to remove wrk_alloc


