#
# ChangeLog for NEMO/branches/2017/dev_r8600_xios_read/DOC/TexFiles/Chapters/Chap_CFG.tex
#
# Generated by Trac 1.0.1
# 2024-07-13T17:28:51+02:00

Wed, 30 May 2018 14:26:44 GMT nicolasmartin [9693]
	* NEMO/branches/2017 (moved)
	* NEMO/branches/2018 (moved)
	* NEMO/branches/CNRS (moved)

	Reorganisation plan for NEMO repository: move non-British branches
	from ...


Mon, 09 Oct 2017 10:11:30 GMT andmirek [8602]
	* branches/2017/dev_r8600_xios_read (copied)

	ticket #1953 - XIOS restart read fuctionality


