#
# ChangeLog for branches/UKMO/dev_r5518_1d_cpl/DOC/NEMO_book.tex
#
# Generated by Trac 1.0.1
# 2024-07-11T11:36:12+02:00

Fri, 23 Feb 2018 15:47:39 GMT frrh [9352]
	* branches/UKMO/dev_r5518_1d_cpl (copied)

	Branch to merge my changes for 0d and 1d field coupling on a master
	PE ...


Tue, 13 Jun 2017 10:13:52 GMT dancopsey [8162]
	* branches/UKMO/dev_r5518_new_runoff_coupling (copied)

	New river runoff coupling scheme


