#
# ChangeLog for branches/UKMO/dev_r5518_CICE_coupling_GSI7_GSI8/DOC/TexFiles/Chapters/Chap_DIA.tex
#
# Generated by Trac 1.0.1
# 2024-07-09T05:14:48+02:00

Mon, 03 Aug 2015 13:47:13 GMT dancopsey [5661]
	* branches/UKMO/dev_r5518_CICE_coupling_GSI7_GSI8 (copied)

	Made branch to store GSI7 and GSI8 coupling changes.


Tue, 30 Jun 2015 11:34:00 GMT hadcv [5515]
	* trunk/DOC/NEMO_book.pdf (modified)
	* trunk/DOC/TexFiles/Chapters/Chap_DIA.tex (modified)

	Add some brief documentation of the CF compliance development.


