#
# ChangeLog for branches/UKMO/dev_r5518_GO6_diag_bitcomp/DOC/NEMO_book.tex
#
# Generated by Trac 1.0.1
# 2024-06-12T01:56:12+02:00

Fri, 18 May 2018 09:47:34 GMT frrh [9607]
	* branches/UKMO/dev_r5518_GO6_diag_bitcomp (copied)

	Changes to ensure diagnostics bit compare on different
	PE decompositions ...


Wed, 20 Apr 2016 09:22:37 GMT davestorkey [6485]
	* branches/UKMO/dev_r5518_GO6_package (copied)

	Package branch for UK GO6 configuration.


