#
# ChangeLog for branches/UKMO/dev_r5518_GO6_package_for_static_diagnostics/DOC/NEMO_coding.conv.tex
#
# Generated by Trac 1.0.1
# 2024-06-13T19:52:36+02:00

Thu, 19 Jan 2017 09:30:14 GMT timgraham [7578]
	* branches/UKMO/dev_r5518_GO6_package_for_static_diagnostics (copied)

	Branch to allow output diagnostics which are constant in our models


Wed, 20 Apr 2016 09:22:37 GMT davestorkey [6485]
	* branches/UKMO/dev_r5518_GO6_package (copied)

	Package branch for UK GO6 configuration.


