#
# ChangeLog for branches/UKMO/dev_r5518_clean_shutdown/DOC/TexFiles/Chapters/Chap_DIA.tex
#
# Generated by Trac 1.0.1
# 2024-07-15T11:46:09+02:00

Mon, 10 Aug 2015 13:43:00 GMT dancopsey [5673]
	* branches/UKMO/dev_r5518_clean_shutdown (copied)

	Make the coupled model shutdown cleanly when there is a problem with ...


Tue, 30 Jun 2015 11:34:00 GMT hadcv [5515]
	* trunk/DOC/NEMO_book.pdf (modified)
	* trunk/DOC/TexFiles/Chapters/Chap_DIA.tex (modified)

	Add some brief documentation of the CF compliance development.


